/// \mainpage RoSA
///
/// \section main_intro Introduction
/// Welcome to RoSA.
///
/// These pages provide API documentation generated from the source code with
/// doxygen. For general documentation on RoSA, please proceed
/// <a href="../../html/index.html">this way</a>.
///
/// \section main_caveat Caveat
/// This documentation is generated directly from the source code with doxygen.
/// Since RoSA is constantly under active development, what you're about to
/// read is out of date! However, it may still be useful since certain portions
/// of RoSA are stable.
///
/// \section main_changelog Changelog
/// Refer to <a href="../../html/Changelog.html">the RoSA Changelog</a>.
